    The file menu has all the options for file input and out.$
From here you can select the image to load, where to save the$
current image, get information about an image, change the DMC$
file to use,change the configuration of the machine, either  $
permenantly or temporary and exit from the program. The 11   $
options are:$
$
       LOAD GIF FILE$
       LOAD XSTICH FILE$
       INFORMATION ABOUT GIF$
       INFORMATION ABOUT XTS$
       SAVE CURRENT PATTERN(XTS)$
       SAVE AS GIF FILE$
       QUIT (NO SAVE)$
       SAVE(XTS) & EXIT$
       SELECT DMC DATA FILE$
       CHANGE CONFIGURATION$
$
     The LOAD, SAVE and INFORMATION options use the current $
working directory.  Changing this directory will change the place$
where all future file loads, saves and information will be made. $
The DMC DATA FILE option uses the dmc working directory. This may$
or may not be the same as the working directory.  The CHANGE $
CONFIGURATION option allows you to change the graphics resolution$
of the monitor, the maximum image height and width and the $
spacing for the dashed lines. The maximum hieght X the maximum $
width cannot exceed the largest amount of free memory. This $
informationcan be saved and will then be the default $
configuration, or it can set for just the current session.$
$
$
WARNING: IF YOU SET THE GRAPHICS SCREEN RESOLUTION FOR GREATER$
THAN YOUR MONITOR/VIDEO CARD CAN HANDLE YOU WILL DAMAGE YOUR $
MONITOR/CARD. IT IS YOUR RESPONSIBLITY TO KNOW THE MAXIMUM $
RESOLUTION. I AM NOT RESPONSIBLE FOR DAMAGE CAUSED BY SETTING $
THE RESOLUTION TOO HIGH.$
